ldecod 1,222,496,642,640 bytes x ms

ms 0.0 50000.0 100000.0 150000.0 200000.0 250000.0 300000.0 350000.0 400000.0 bytes

0k 200k

400k

600k

800k

1,000k

1,200k

1,400k

1,600k

1,800k

2,000k

2,200k

2,400k

x806C977:get_mem2Dint x806C8D9:get_mem2D x804F622:main x8059F2B:init_global_buf x80680DA:alloc_storable_ x806D07E:get_mem2Dshort x806D096:get_mem2Dshort x8059898:initialize x8059723:initialize x806C6C9:get_mem2Dpel x8059C32:AllocPartition x806CA17:get_mem2Dint64 x80595BE:initialize x804F608:main